/*
 Navicat Premium Dump SQL

 Source Server         : qdhome.iot321.top
 Source Server Type    : MySQL
 Source Server Version : 50740 (5.7.40-log)
 Source Host           : qdhome.iot321.top:33003
 Source Schema         : pla-chem-sim-dev-1

 Target Server Type    : MySQL
 Target Server Version : 50740 (5.7.40-log)
 File Encoding         : 65001

 Date: 11/12/2024 00:39:35
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for sim_major
-- ----------------------------
DROP TABLE IF EXISTS `sim_major`;
CREATE TABLE `sim_major`  (
  `major_id` bigint(20) NOT NULL DEFAULT 0 AUTO_INCREMENT COMMENT '专业ID',
  `major_name` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL DEFAULT '' COMMENT '专业名称',
  `createBy` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '创建者',
  `create_time` datetime NULL DEFAULT NULL COMMENT '创建时间',
  `update_by` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '更新者',
  `update_time` datetime NULL DEFAULT NULL COMMENT '更新时间',
  `remark` varchar(500) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '备注',
  PRIMARY KEY (`major_id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 7 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci COMMENT = 'sim-专业表' ROW_FORMAT = DYNAMIC;

SET FOREIGN_KEY_CHECKS = 1;
